335 340 345 350 355 360 365 370 375 380 0 10 20 30 VENT

(m/s)

ALMOFRONT 2

335 340 345 350 355 360 365 370 375 380 0 100 200 300

VENT Dir

Degrees

335 340 345 350 355 360 365 370 375 380 990 1000

1010

1020

1030

Pa mbars

335 340 345 350 355 360 365 370 375 380 12 14 16 18 20 Ta

°C