North Comp. (cm s-1)

024681012141618202224sample no

-50502004006008001000

Total Mass Flux (mg m-2 d-1)

20285132129715233181624191725311192741220286JUNE

AUGUST

OCTOBER

DECEMBER

1992024681012141618202224sample no

0510

Speed (cm s-1)

EUMELI MESO 2500m EU 4-5