-10-50510

North Comp. (cm s-1)

024681012141618202224sample no

-10-505100255075100

Total Mass Flux (mg m-2 d-1)

14244142431323313232122211212122211211121OCTOBER

DECEMBER

FEBRUARY

APRIL

1992024681012141618202224sample no

01020

Speed (cm s-1)

EUMELI OLIGO 1000m EU 3-4