-10-50510

North Comp. (cm s-1)

024681012141618202224sample no

-10-505100255075100

Total Mass Flux (mg m-2 d-1)

29818281020309192991929818288182871727616266FEBRUARY

APRIL

JUNE

AUGUST

OCTOBER

1991024681012141618202224sample no

05101520

Speed (cm s-1)

EUMELI OLIGO 1000m EU 2-3