start

122/061100 stop20449

52/004300

ashmd1a2

CPfile:gpshead

0 0.00N

0 0.00E

22.0

26.0

30.0

34.0

38.0

42.0

46.0

50.0jday dayofyr

1gps-gyro degrees

-8-6-4-202gyrohead

01803605407203pdop

05101520