ANTARES 2Salinit� (PSU)

Profondeur (m)050010001500200025003000350040004500500033.633.83434.234.434.634.8ANTARES 2Alcalinit� Totale (m�q/kg)

Profondeur (m)0500100015002000250030003500400045005000227523002325235023752400ANTARES 2Carb. inorg. total (mM/kg)

Profondeur (m)050010001500200025003000350040004500500021002150220022502300